Webometrics

Webometrics Data

2010.06.07

Institute Visibility Size* pdf ps ppt doc Scholar Seoul National University 243,291 1,980,000 18,400 202 2,140 689 10,900 National Sun Yat-Sen University 348,389 509,000 12,200 237 1,770 6,790 17,100 University of Hong Kong 387,830 563,000 67,300 557 1,830 3,700 39,200 National University of Singapore 389,161 222,000 47,500 860 1,600 3,320 10,400 Peking University 1,139,766 503,000 12,700 229 2,120 6,740 7,020 University of Cambridge 1,578,969 876,000 70,900 2,900 1,490 4,470 14,000 University of Tokyo 1,579,719 544,000 98,400 545 2,520 3,100 28,700 National Taiwan University 1,817,000 761,000 94,600 209 6,240 22,600 210,000 Stanford University 6,249,770 2,460,000 297,000 9,690 10,100 9,280 51,600 Harvard University 6,279,581 9,330,000 143,000 4,990 3,490 6,140 2,050,000 Massachusetts Institute of Technology 8,625,892 1,890,000 468,000 12,500 4,470 3,630 71,000

Logarithm

Institute Visibility Size* pdf ps ppt doc Scholar Seoul National University 5.39 6.30 4.26 2.31 3.33 2.84 4.04 National Sun Yat-Sen University 5.54 5.71 4.09 2.37 3.25 3.83 4.23 University of Hong Kong 5.59 5.75 4.83 2.75 3.26 3.57 4.59 National University of Singapore 5.59 5.35 4.68 2.93 3.20 3.52 4.02 Peking University 6.06 5.70 4.10 2.36 3.33 3.83 3.85 University of Cambridge 6.20 5.94 4.85 3.46 3.17 3.65 4.15 University of Tokyo 6.20 5.74 4.99 2.74 3.40 3.49 4.46 National Taiwan University 6.26 5.88 4.98 2.32 3.80 4.35 5.32 Stanford University 6.80 6.39 5.47 3.99 4.00 3.97 4.71 Harvard University 6.80 6.97 5.16 3.70 3.54 3.79 6.31 Massachusetts Institute of Technology 6.94 6.28 5.67 4.10 3.65 3.56 4.85

Normalization and Standing

Institute Vis Size* pdf ps ppt doc Scholar Score Standing Seoul National University 0.78 0.90 0.75 0.56 0.83 0.65 0.64 77.02 11 National Sun Yat-Sen University 0.80 0.82 0.72 0.58 0.81 0.88 0.67 77.88 9 University of Hong Kong 0.81 0.83 0.85 0.67 0.81 0.82 0.73 79.96 8 National University of Singapore 0.81 0.77 0.82 0.72 0.80 0.81 0.64 77.25 10 Peking University 0.87 0.82 0.72 0.58 0.83 0.88 0.61 80.82 7 University of Cambridge 0.89 0.85 0.86 0.85 0.79 0.84 0.66 84.22 5 University of Tokyo 0.89 0.82 0.88 0.67 0.85 0.80 0.71 84.12 6 National Taiwan University 0.90 0.84 0.88 0.57 0.95 1.00 0.84 88.34 4 Stanford University 0.98 0.92 0.97 0.97 1.00 0.91 0.75 93.07 3 Harvard University 0.98 1.00 0.91 0.90 0.88 0.87 1.00 97.41 1 Massachusetts Institute of Technology 1.00 0.90 1.00 1.00 0.91 0.82 0.77 93.88 2

Simplification and Approximation

Size

Google only Normalization by the local maximum, not by the global maximum Combined score based on log-normalized value, not based on the rank Data is dynamic could change dramatically in the next few weeks

Catching Up

Focus on the rich files

Make the ppt files visible to the spiders Provide multiple formats for each document Not difficult to do, but require manual efforts by the faculty and the staff Need immediate actions as it takes time for the search engine to update their database Based on current data, the difference is predicted to be very significant . . .